-- Add migration script here

-- Create Label
CREATE TABLE settings
(
    id bigint NOT NULL GENERATED ALWAYS AS IDENTITY ( INCREMENT 1 START 1 ),
    mhd text NOT NULL,
    bio text NOT NULL
);

-- Insert default values
INSERT INTO settings (mhd, bio) VALUES ('Mindestens haltbar bis:', 'DE-ÖKO 006');
